T (ms) Δ 200 400 600 800 1000 1200 1400 1600 1800 2000

Entries/20ms

0 20 40 60 80 100 120 140 160 180 200 220 240

He enriched data 8 Li+ 9 Best-fit: accidental + Li Best-fit: accidental component