Visible energy (MeV)

5 10 15

Entries/0.25 MeV

1 10 210 310 410^{IBD candidates, w/o ANN cut}

IBD candidates, w/ ANN cut Accidental BG, w/o ANN cut Accidental BG, w/ ANN cut