)_{13}θ(2^2sin

0 0.05 0.1 0.15 0.2

2χΔ

0

5

)_{13}θ(2^2sin

0 0.05 0.1 0.15 0.2

)^{-1} nGd Background rate (day

1

1.5

2

2.5

DC-III (nH) Preliminary 2χΔ 0 5 10

Background (events/day)

1

1.5

2

2.5

)_{13}θ(2^2sin

0 0.05 0.1 0.15 0.2

)^{-1} nH Background rate (day

6 6.5 7 7.5 8 8.5 9

99.7% C.L. 95.5% C.L. 68.3% C.L. Best-fit 2χΔ 0 5 10

Background (events/day)

6

6.5

7

7.5

8

8.5

9